DROP DATABASE IF EXISTS `crowd-test-service`;
CREATE DATABASE IF NOT EXISTS `crowd-test-service` DEFAULT CHARACTER SET utf8 COLLATE utf8_general_ci;
DROP DATABASE IF EXISTS `mooctest_user`;
CREATE DATABASE IF NOT EXISTS `mooctest_user` DEFAULT CHARACTER SET utf8 COLLATE utf8_general_ci;
USE `crowd-test-service`;